X-Git-Url: https://git.mdrn.pl/librarian.git/blobdiff_plain/e7418c1630ea9b12415edc4ac1fa9e8c08679ded..5a305ce217533f035b068c39d7c117781af47c9b:/librarian/pdf/wl.cls?ds=sidebyside

diff --git a/librarian/pdf/wl.cls b/librarian/pdf/wl.cls
index 3114562..eaaebcc 100644
--- a/librarian/pdf/wl.cls
+++ b/librarian/pdf/wl.cls
@@ -12,6 +12,7 @@
 % a4paper,... - paper size as required by LaTeX
 % nowlfont - don't use customized WL font
 
+\RequirePackage{fixltx2e}
 \RequirePackage{setspace}
 \RequirePackage{type1cm}
 \DeclareOption{13pt}{%
