X-Git-Url: https://git.mdrn.pl/librarian.git/blobdiff_plain/57dc61cf3e34d3acd054383842be40b974e2e2cf..97ed31c1ea6c21e0ac6cad0bc25a3cf63ecdd1ad:/librarian/pdf/wl.cls?ds=sidebyside

diff --git a/librarian/pdf/wl.cls b/librarian/pdf/wl.cls
index 415e14a..c9305ca 100644
--- a/librarian/pdf/wl.cls
+++ b/librarian/pdf/wl.cls
@@ -11,8 +11,7 @@
 % a4paper,... - paper size as required by LaTeX
 % nowlfont - don't use customized WL font
 
-%\usepackage{setspace}
-
+\RequirePackage{setspace}
 \RequirePackage{type1cm}
 \DeclareOption{13pt}{%
 \AtEndOfClass{%
@@ -43,6 +42,12 @@
 \DeclareOption{doubleleading}{\AtBeginDocument{\doublespacing}}%\setlength{\leading}{1em plus 0.5ex minus 0.2ex}}
 \DeclareOption{onehalfleading}{\AtBeginDocument{\onehalfspacing}}%\setlength{\leading}{1em plus 0.5ex minus 0.2ex}}
 
+%% This does not really work, since dvipdfm(x) will use it's configuration in /etc/texmf/dvipdfm(x) and force a global paper size setting.
+\DeclareOption{a5paper}{%
+      \setlength{\paperheight}{210mm}%
+      \setlength{\paperwidth}{148mm}}
+
+
 \newif\ifshowfootnotes \showfootnotestrue
 \DeclareOption{nofootnotes}{\showfootnotesfalse}
 
@@ -239,6 +244,9 @@ Letters={SmallCaps,UppercaseSmallCaps}
 
     \editors
 
+    \vspace{.6em}
+    \coverby
+
     \color{black}
   }
   \end{figure}
