X-Git-Url: https://git.mdrn.pl/librarian.git/blobdiff_plain/57dc61cf3e34d3acd054383842be40b974e2e2cf..1ffcf32a8d795681f54bd125ca45e908da5ed3fb:/librarian/pdf/wl.cls

diff --git a/librarian/pdf/wl.cls b/librarian/pdf/wl.cls
index 415e14a..c387b03 100644
--- a/librarian/pdf/wl.cls
+++ b/librarian/pdf/wl.cls
@@ -6,13 +6,13 @@
 %
 % nofootnotes - disable generation of footnotes
 % nothemes - disable generation of themes
+% defaultleading - default leading
 % onehalfleading - leading of 1.5 (interlinia)
 % doubleleading - double leading (interlinia)
 % a4paper,... - paper size as required by LaTeX
 % nowlfont - don't use customized WL font
 
-%\usepackage{setspace}
-
+\RequirePackage{setspace}
 \RequirePackage{type1cm}
 \DeclareOption{13pt}{%
 \AtEndOfClass{%
@@ -40,9 +40,16 @@
 
 %% \DeclareOption{14pt}{\renewcommand{\normalsize}{\AtEndOfClass{\fontsize{14}{17}\selectfont}}}
 
+\DeclareOption{defaultleading}{}
 \DeclareOption{doubleleading}{\AtBeginDocument{\doublespacing}}%\setlength{\leading}{1em plus 0.5ex minus 0.2ex}}
 \DeclareOption{onehalfleading}{\AtBeginDocument{\onehalfspacing}}%\setlength{\leading}{1em plus 0.5ex minus 0.2ex}}
 
+%% This does not really work, since dvipdfm(x) will use it's configuration in /etc/texmf/dvipdfm(x) and force a global paper size setting.
+\DeclareOption{a5paper}{%
+      \setlength{\paperheight}{210mm}%
+      \setlength{\paperwidth}{148mm}}
+
+
 \newif\ifshowfootnotes \showfootnotestrue
 \DeclareOption{nofootnotes}{\showfootnotesfalse}
 
@@ -239,6 +246,9 @@ Letters={SmallCaps,UppercaseSmallCaps}
 
     \editors
 
+    \vspace{.6em}
+    \coverby
+
     \color{black}
   }
   \end{figure}
