X-Git-Url: https://git.mdrn.pl/librarian.git/blobdiff_plain/03c2258429bf8f80e88025fce45126960bfcd827..780580aeaeb3a8745744eb918100fee78a6e16b8:/librarian/pdf/wl.cls?ds=sidebyside

diff --git a/librarian/pdf/wl.cls b/librarian/pdf/wl.cls
index 206d236..2d3b309 100644
--- a/librarian/pdf/wl.cls
+++ b/librarian/pdf/wl.cls
@@ -93,7 +93,8 @@
 }%
 }
 
-\XeTeXgenerateactualtext=1
+%  not supported on texlive version on jessie, and has weird side effects in some readers
+%% \XeTeXgenerateactualtext=1
 
 %% \DeclareOption{14pt}{\renewcommand{\normalsize}{\AtEndOfClass{\fontsize{14}{17}\selectfont}}}
 
