X-Git-Url: https://git.mdrn.pl/librarian.git/blobdiff_plain/016496137ecab524164f1de8ad17ccf791469166..c5ed685cce7a1d4666e36f1415ae449ab09cf0b9:/librarian/formats/pdf/res/wl.cls

diff --git a/librarian/formats/pdf/res/wl.cls b/librarian/formats/pdf/res/wl.cls
index c2f8ffb..ac423be 100755
--- a/librarian/formats/pdf/res/wl.cls
+++ b/librarian/formats/pdf/res/wl.cls
@@ -94,6 +94,7 @@ SmallCapsFont = Dosis-Regular,
 %BoldFont = Junicode-Bold,
 %BoldItalicFont = Junicode-BoldItalic,
 %SmallCapsFont = JunicodeWL-Regular,
+AutoFakeSlant=0.2,
 SmallCapsFeatures = {Letters={SmallCaps,UppercaseSmallCaps}},
 Numbers=OldStyle,
 Scale=1.04,
